1 Dvi2700
!********************************************************
!*                                                      *  
!*                                                      *  
!*                      Dvi2700                         *  
!*                                                      *  
!*                                                      *  
!********************************************************

Dvi2700 is a program to convert the output of TeX (a .dvi  file)
to a file suitable for a Xerox 2700 model II.
2 Usage
In order to use Dvi2700, first create a DCL symbol for Dvi2700

           $ DVI2700 :== $DVI2700

Users who execute SYS$SYSTEM:LOCALCMDS.COM will have  this  done
automatically.  To process a file, issue the command:

           $ DVI2700 [flags] infile outfile

Particular pages can be produced with the -pn or -pn:m  options.
Just  the  even  or  odd  pages  may  processed  with  -e or -o.
Additional logging information will be produced if the -v option
is given.  The default page size may be changed with -xn and -yn
options.
2 Authors
Dvi2700 was written by Maurice Wuts.
2 Bugs
There are no known bugs.
2 Fonts
Dvi2700 will use either GF or PXL files  for  font  information.
Any  fonts  required  must be available in one of these formats.
Not all fonts  are  available  on  all  systems.   If  you  need
additional  fonts,  please contact your host administrator.  The
logical name GF_FONTS must be a path containing the GF files and
the  file  x2700cap.   X2700cap  contains the names of the fonts
that are spooler loadable and  thus  are  not  included  in  the
output  file.   See  the  default definition of GF_FONTS for its
location.  The logical name TEXFONTROOT  must  be  a  device  or
rooted directory where the PXL file directories may be found.
