1 CRATE
CRATE converts a (VAX/VMS) DIGS binary graphics file into a formatted 
ASCII (card image) file, which may be reassembled into a binary DIGS 
file with UNCRATE.  The formatted file may be used to transport such
DIGS files between computer systems.  In particular, at Fermilab, NET
may be used to move such files between the Cyber and VAX central facility
machines, and DECnet may be used to communicate with any VAXes on the
network.  This makes graphics printing devices available throughout the
facility, regardless of the origin of the graphics files.
CRATE and UNCRATE were written by John Ingebretsen of Fermilab.

Usage:
	RUN LIB:[LIB.CRATE]CRATE
	or
	RUN LIB:[LIB.CRATE]UNCRATE
Files:
	DIGS$DGF or DIGF
		Digs file input to CRATE, or output from UNCRATE
		Default file name is DIGS.DAT
	DIGS$DGFT or DGFTOGO
		Crated file output from CRATE, or input to UNCRATE
		Default file name is DGFTOGO.DAT
