!Program:  INUSE.EXE
!
!Origin:   DECUS SYMPOSIUM FALL 1978
!
This program gives the user a very nice way of insuring nobody else will
use his terminal while he is gone for a bit.

Before leaving your terminal do the following:

	SET NOCONTROL_Y
	RUN INUSE
	...The program asks your name, say JOHN
	...The program asks for a pasword, say 1234

	The program then fills the screen with characters making your name.
	CONTROL Y will not interrupt the program.

	Use CONTROL C to get the program to respond with prompt for password.
	Give the password and you're back on the air.

	For safety you'd better SET CONTROL_Y before proceeding.
