RESEQ is a program to resequence Fortran programs.  Any program or  rou-
tine  to  be resequenced is assumed to be syntactically correct and have
no undefined statement labels.

The form for the command line is:

                    output-file=input-file/switches

where 'output-file' and 'input-file' are any valid file specification in
the  form device:[directory]file.ext;version, and '/switches' are any of
the valid switches.
*Qualifiers
/FORMAT=n
 This switch specifies that FORMAT statements are to  be
 resequenced independently of other statements, and that
 the first FORMAT statement will have the label 'n'.
/INCREMENT=n
 This switch specifies  the  increment  to  use  between
 label  (both  FORMAT statements and any other statement
 which have labels).
/LIST
 This switch indicates that a listing of the resequenced
 program  is  to be put in the file "NEWFILE.LIS".  This
 may be used with /SYMBOLS.
/STATEMENT=n
 This switch specifies the first label to be  used  when
 resequencing the program or routine.  If /FORMAT is not
 used, FORMAT statements will be resequenced in sequence
 with any other statement which has a label.
/SYMBOLS
 This switch indicates that the symbol  table  (the  old
 label  and  the  new  label  that replaces it) is to be
 written to the file "NEWFILE.LIS".  This  may  be  used
 with /LIST.
