.np
.rm 68
.m2 0
     This command changes the default (current) directory.
There are several options available:
.sp
.nf
.in +7
local-dir -  Change directory down to relative "local-dir" path
>path     -  Change directory to absolute "path"
<         -  Change up to next higher directory
(no arg)  -  Change to user's home directory
-PREV     -  (or "-P") Change to previous directory
-F        -  Show format of the Change-Directory command
-H        -  Display help for the Change-Directory command
.in -7
.sp
.fi
For this command, a directory path consists of names separated
by periods (.).  Bracket symbols ([,]) are not necessary, and are ignored
if present.
.sp
Note that the -PREV option will enable switching between
two directories.
