.np
.rm 66
.m2 0
     This command types the file(s) specified by "file-spec" a page
at a time to the user's terminal.
If "file-spec" is omitted, the remembered file will be typed.
At the end of each page typed, the user is prompted with ":".
Valid responses are:
.sp
.nf
.in +3
Q - Quit typing the file      ? - Show name of file being typed
/ - Skip past next page       = - Show current line number
H - Give help on valid responses
.in -3
.fi
.sp
Any other response will continue with the next page.
.sp
     Multiple files can be typed to the terminal
since "file-spec" may be a single file name or several file
names separated by commas (wild card characters are also allowed).
Each file typed is preceded by a file-name title.
.sp
The following list explains the command options:
.sp
.nf
 -PAGELEN:n - (or "-P") set page length to "n" lines; default is 22
 -READ      - (or "-R") suppress file-name title; file is read as text
.br
.fi
