.np
.rm 66
.m2 0
     This command copies the file(s) specified by "file-spec" into
the LSMOC code library under the grouping "Processor-name".
All files posted will replace any earlier versions already
posted.
.sp
.in +3
.nf
"Processor-name" can be:  TPMON  LOGPRO  DBIP  DBUP  SUSPRO  AUDIT
"file-spec" may contain wild-card characters (*).
.fi
.in -3
.sp
A file will be posted in the LSMOC code library as
.sp
.ce
[LSMOCCODE.Processor]Filename.TEX
.sp
Each LSMOC program or subprogram should be posted as a
separate file.  Note that the maximum length for a
VAX FORTRAN subprogram name is 15 characters, but a VAX file
name is limited to only 9.
