1 INUSE

	o Allows users to protect their terminals from use for up to
	  one hour.

	o INUSE only supports VT100 terminals (and compatible substitutes)

	o INUSE will prompt you for a password (anything you want) and
	  will ask you to type it again to be sure you know it.

	o The only way to stop INUSE is to type ^C or ^Y and give the
	  correct password

	o After one hour, INUSE will log the terminal off.
