1 SCHED

  o Displays the current status of Operator availability

	Either:	"Operator on duty"  if there is an Operator around.
	or	"No Operator on duty" if the machine is unattended.

  o Displays the current state of timesharing

	Either: "Unlimited timesharing" if there is no scheduled shutdown.
	or	"Timesharing ends in ..." if there is a shutdown pending.

