1	XQT
XQT is designed to simulate (within the limitations imposed by VMS) the
.XQT and multi-tasking features of RSX-11M. There are times when issuing
a single immediate mode command would lock up an interactive terminal
for a long time. This command procedure is designed to be used to submit
single line DCL or MCR commands for BATCH processing. It is designed to
be used as a Foreign command ie.

		XQT:==@SYS$SYSDISK[SYSMGR.CMDFIL]XQT

Once set as a foreign command,one but need issue a command of the form

		XQT cmd_line

If there is no command line present, XQT will prompt for a single
command (which must be less than about 80 characters to satisfy passing
parameters on the SUBMIT command. XQT will then submit itself with for
BATCH processing with the decoded parameters passed to BATCH. It can do
this because it follows different paths depending on whether or not the
user is logged on to BATCH or an interactive terminal. Finally, the
procedure passes back a message to the user who submitted the command
that the process is done. No log file will be spooled, but XQT.LOG will
be sitting on the user's directory for examination.
