1 FIXED_$
      FIXED invokes the Westat fixed record length file utility.  This utility 
   will copy any file, fixed or variable, into a newly created file of a fixed 
   length specified by the user.  The fixed length may vary from 10 to 4000
   bytes.
      The utility will prompt for the name of the input file, the name of the 
   output file, the length of the fixed records to be written, and the number 
   of records to be copied.
      If either the input file or the file to be written is on tape, the tape
   must be allocated and mounted. (See HELP ALLOCATE and HELP MOUNT.)  The 
   output file cannot be on a tape that is mounted foriegn.

   Example:
   
   $ ALLOCATE MTA0:
     _MTA0: ALLOCATED
   $ MOUNT MTA0: LABEL
   %MOUNT-I-MOUNTED, LABEL mounted on _MTA0:
   $ FIXED

                       WESTAT FIXED LENGTH RECORD UTILITY

      Enter name of input file:   MTA0:FILE.VAR
      Enter name of output file:  FILE.FXD
      Enter length of fixed records:  80
      Copy all records in MTA0:[USERNAME]FILE.VAR;2? (Y/N):  Y

   %FXD-S-COPIED, MTA0:[USERNAME]FILE.VAR;2 copied to DRC1:[USERNAME]FILE.FXD;1
   -FXD-I-RECLENGTH, ---- Fixed length 80 byte records.
   $
