1 SASLIST_$
  This routine will dump files in a format similar to what SAS would
 do with a LIST statement. If the data is all printable characters,
 then just those characters are printed. Otherwise a '.' character is
 printed, along with 2 extra lines of HEX characters, the more
 significant (zone) nibble on the first line and the numeric nibble on
 the second line. The output reads from left to right, unlike the
 DCL DUMP, which reads from right to left bytewise (but left to right
 nibble-wise). 

  The source is in SYS:[SYSTEM]TSVXLIST.PLI along with SVXLIST.PLI and
 PARSVXLST.MAR. The author of these programs is Tip Dow. If you have any
 questions, please contact Tip.

  To run:
  
     $ SASLIST filespec qualifiers 
 
  The output is directed to SYSPRINT (i.e., the terminal). To send
 output to a file, $ASSIGN output-file-spec SYSPRINT. You may also 
 specify the file to be dumped, $ASSIGN input-file-spec INFILE.

  If your input is on an unlabelled tape, use DUMPLIST rather than 
 SASLIST. For help in using DUMPLIST type $HELP DUMPLIST.
2 Qualifiers
/LOWER 
  Lower case is available (eg. on your terminal, or printer LPA0:).
 Otherwise only upper case characters are considered printable.
/FOLDSIZE=nnn
  Maximum size of a dumped print line. This defaults to 100. If you
 have an 80 column terminal, you might set /FOLDSIZE=50.
/RANGE=nnn:[mmm]
  Where nnn:[mmm] is the range of record numbers to print. (the file starts 
 at 1). If only one bound is given, only that record number is printed. If 
 no range is given, the default is 1:2417483645.


