1 RESEQUENCE
 Resequence labels, by program unit, of VAX-11 compatible FORTRAN  code.
 All  program units (e.g., subroutines), contained in a single file will
 be resequenced separately.

 Format:

         RESEQUENCE [file-spec]

2 Parameters
file-spec

 Specifies name of FORTRAN source file to be  resequenced.   Resequenced
 code  is written to a new version under the same file name(s).  Default
 file type is "FOR".  All VMS wildcard specifications are permitted.

2 Qualifiers
/INCREMENT[=n] (D=20)

 Incremental difference to be  used  in  generating  new  labels.   This
 qualifier has a maximum value of 99 and must be greater than zero.
/FORMAT_LABEL[=n]

 Starting label at which  "FORMAT"  statements  are  to  begin  in  each
 program  unit.   Must  be decimal integer having value less than 50001.
 The value must be large enough so as to not interfere with the labeling
 of other FORTRAN statements.  For example,

                /FORMAT_LABEL=8000
