1 GETQUOTA
 This program acts as a pseudo-lexical function to allow DCL to
 access the information in the disk quota file without resorting to
 procedures to parse the output from the DISKQUOTA program.  The
 format of the command is:

	$ GETQUOTA[qualifiers]  [[device:]uic]

 The command must be defined as a DCL command by executing:

	$ SET COMMAND FERMI$EXE:GETQUOTA

2 Parameter
 If no parameter is specified, the disk quota entry for the current UIC
 of the process is accessed on the current default (SYS$DISK:) disk.  A
 particular UIC may be specified by a parameter of the format:

	[ggg,mmm]

 where "ggg" and "mmm" are the group and member numbers (in octal).  The
 brackets are required syntax.  A specific device may be specified as:

	device:

 or with a UIC as:

	device:[ggg,mmm]

 with the ":" being required syntax.  If a UIC other than the process's
 is to be examined, read access to the quota file is required.
2 Qualifiers
/PERMANENT=sym
 The permanent disk quota is returned in the specified local DCL symbol
 as a text string of digits.  F$INTEGER() may be used to convert to a
 binary numeric value.
/OVERDRAFT=sym
 The overdraft disk quota is returned in the specified local DCL symbol
 as a text string of digits.  F$INTEGER() may be used to convert to a
 binary numeric value.
/USED=sym
 The current disk usage is returned in the specified local DCL symbol
 as a text string of digits.  F$INTEGER() may be used to convert to a
 binary numeric value.
