1	SETUIC

	SETUIC allows users to display their current UIC and if the
	user has GROUP, WORLD, or SYSPRV privilege to change their UIC.
	If the user has GROUP privilege, the UIC may be changed within
	the group.  If the user has WORLD privilege, the user may change
	both group and member number provided the group is > a preset
	minimum value (currently set at 311).  If the user has SYSPRV,
	any UIC is legal.

	SETUIC is defined in SYSLOGIN.COM as a FOREIGN command
		SETUIC:==$SYS$SYSDISK:[SYSUTL]SETUIC
	and is installed with CMKRNL privilege during sysboot so all users
	can use it.

		SETUIC	           ->  Displays UIC
		SETUIC [ggg,mmm]   ->  Change UIC to [ggg,mmm]
		SETUIC  ggg,mmm    ->  Change UIC to [ggg,mmm]

2	SOURCE_LOCATION
	Found on [SYSUTL] directory.
