1 BYTETOVAR
  Converts input file from Byte Stream to Variable Length record file.
  This can be used to convert the output file, from a C program (which
  will generate a byte stream file) into a standard text file.

	$ BYTETOVAR  input-file  [output-file]

  Parameters
	input-file	- Byte stream file.  If omitted standard input
			  is used.
	output-file	- Output file name.  If omitted, then output is
			  written to standard output (terminal).
  Supplier
	D. Amby,	Send mail to AMBY for problems/questions.
