1 ENTAB
  Inserts TAB characters, for 8 column standard TAB stops, into input file.

	$ ENTAB  [input-file]  [output-file]

  Parameters

	input-file	- Text file with blanks in it.
			  If omitted, standard input (SYS$INPUT) used.
	output-file	- Optional, output file spec.
			  If omitted, standard output (SYS$OUTPUT) used.

  Supplier
	D. Amby, so send mail to AMBY if you have problems/comments.
