1 PAGINATE
  This can be used to paginate an input file to have a heading on each
  page and form feeds inserted such that only 'page_length' lines on each 
  page in the output file.

	$ PAGINATE  input_file  output_file  page_length  header_length

  Parameters
	input_file	- Input file to paginate.
	output_file	- Output file, default is SYS$OUTPUT.
	page_length	- Length of each output page, default is 55.
	header_length	- Header length (from beginning of input) to be
			  used as header on each output page, def is 0.
  Supplier
	D. Amby,	so send mail to AMBY for comments/problems.
