1 VARTOBYTE
  Converts input file from Variable Length record to Byte Stream file.

	$ VARTOBYTE  input-file  [output-file]

  Parameters
	input-file	- Varialble length record file.  If omitted standard
			  input is used.
	output-file	- Output file name.  If omitted, then output is
			  written to standard output (terminal).
  Supplier
	D. Amby,	Send mail to AMBY for problems/questions.
