1 BLDDESCR
  Build a standard MMS descriptor file for a directory.  This will
  create DESCRIP.MMS and AAAREADME.MMS template files, in the current
  default directory.

	BLDDESCR  log-name  [dir-kind]

  Parameters
	log-name	- Logical name to be defined for this directory.
	dir-kind	- Optional, where TOOLKIT indicates a toolkit main
			  directory.  If omitted, a normal directory.
  Supplier
	D. Amby,	send mail to AMBY for problems/comments.
