1 BLDSETLOG
  Build a standard tool directory logical name definition command procedure.
  This assumes that the default name of the output file is SETLOGS.COM, and
  that the directory is the current default.

	BLDSETLOG  log_name  [output_file]  [dir_spec]

  Parameters
	log_name	- Logical name for directory.
	output_file	- Optional, output file name.  If omitted SETLOGS.COM
			  will be assumed.
	dir_spec	- Optional, output directory name.  If omitted, the
			  current default directory is assumed.

  Supplier
	D. Amby,	send mail to AMBY for problems/comments.
