1 BLDSETUP
  Build a standard tool directory setup command procedure.  This assumes that
  there are two files in the output directory (SETLOGS.COM and SETSYMBS.COM)
  that must be run to set up access to the tools.

	BLDSETUP  [output_file]  [dir_spec]

  Parameters
	output_file	- Optional, output file name.  If omitted SETUP.SET
			  will be assumed.
	dir_spec	- Optional, output directory name.  If omitted, the
			  current default directory is assumed.

  Supplier
	D. Amby,	send mail to AMBY for problems/comments.
