1 TRMPRINT
 TRMPRINT is a utility that allows users to print text files to the
 printer attached to their local terminal. TRMPRINT works with all
 VT100 family terminals that have an attached printer  including
 the RAINBOW 100 and PRO-350 personal computers. The local printer
 should be a LA-50 or LA-100 dot matrix printer, However the "/FOREIGN"
 qualifier should allow printing on any type of local printer.
2 Parameters
 A parameter to TRMPRINT may be a single file specification or a list
 of file specifications separated by commas. A file specification may
 consist of any legal VMS wildcard characters ("*" and "%")
 TRMPRINT will default to file type ".MEM" (RUNOFF output) for
 files printed with the /LETTER qualifer and to ".LIS" file type
 for all others.

2 Qualifiers

/BOLD

 Selects bold face printing.

/COPIES

 /COPIES=value
 Where "value" is the number of copies to be printed.
 The default is one copy.

/FOREIGN
 Allows printing on a non LA-50 or non LA-100 printer. If this 
 qualifier is specified then the "/LETTER" and  "/BOLD" qualifiers 
 will be ignored.

/FORM

 /NOFORM (D)
 This qualifier directs TRMPRINT to insert a form-feed between
 pages and is should not be specified when a file has its own
 imbedded form-feed characters (compiler  listing files  and
 RUNOFF output files usually have imbedded form-feed characters).
 The default is /NOFORM.

/LETTER

 /NOLETTER (D)
 Causes the LA-100 printer to print in letter quality mode, and
 causes the LA-50 printer to print in enhanced density mode.

/HEADER

 /NOHEADER (D)
 Directs TRMPRINT to place a header line with the file name,
 date and time and page number on the  top of each  page. If
 /FORM has not been specified also then /HEAD will  only
 place a header line at the beginning of each file. The default
 value is /NOHEAD

/OVERSTRIKE

 Directs TRMPRINT to overstrike each line for darker output.
 This qualifier has no effect on RUNOFF output files. (RUNOFF can
 do its own overstriking). This qualifier can serve to get very
 dark output when combined with the /BOLD qualifier as well as
 allowing the user to get bold face output on foreign printers.

/PAGE

 /PAGE=value
 Specifies the number of lines per page. The default is 66 lines 
 (the standard for LA-50 and LA-100 printers).

/WIDTH

 /WIDTH=value
 Specifies the width of the page in columns. Legal values are 80, 96,
 and 132. The default is 80.
2 Aborting
 TRMPRINT may be aborted by striking Control/Y or Control/C. This action
 will turn off the local printer and restore the default terminal
 characteristics. Note: There may be a slight pause before the terminal
 is reset. In addition, some printers have a sizable character buffer and
 may take some time to actually stop printing.
