JTo build C-Kermit for VMS, use the CKVKER.COM DCL procedure, which in turnCuses the CKVMAK.COM DCL procedure to compile each module that needsCcompiling.  CKVMAK.COM checks the creation date of the C source and?object files, skipping compilation if the object is up to date.ENote that it doesn't check header file dates, and thus cannot replace_.the Unix make utility, or the Dec MMS product.FNote that sites that currently use Vax C, version 1 (on VMS Version 3)Fmay need to edit the definition of LNK$LIBRARY in CKVKER.COM, as noted/in the commentary at the beginning of the file.