1	JNLBACKUPD	JNLBACKUP is a VAX command procedure which is used to automaticallyEback up your files to tape and to keep a journal and log of the filesHbacked up and the tapes used for the backup.  Complete documentation on Fhow to use JNLBACKUP is found in JNLBACKUP.MEM. To use JNLBACKUP type CMD JNLBACKUP.GJNLBACKUP can be used to backup any or all files in your directory(ies)Fwhich have been created since a certain date.  The backup accuracy is @automatically verified.  The backed up files are stored in a VMSDBACKUP container file which is automatically given a unique save-set@name.  Multiple backups may be done to a given backup tape.  TheCvarious times JNLBACKUP is used is logged to a file (JNLBACKUP.LOG)Ashowing the tape name and number, the dates, directories and the @files selected for backing up.  This log file together with the ?journal file (JNLBACKUP.BJL) containing a list of all backed upAfiles, can be used to recover one or more files from the specificbackup set required.