1	XQTGXQT is designed to simulate (within the limitations imposed by VMS) theH.XQT and multi-tasking features of RSX-11M. There are times when issuingEa single immediate mode command would lock up an interactive terminalHfor a long time. This command procedure is designed to be used to submitGsingle line DCL or MCR commands for BATCH processing. It is designed to be used as a Foreign command ie.&		XQT:==@SYS$SYSDISK[SYSMGR.CMDFIL]XQTFOnce set as a foreign command,one but need issue a command of the form		XQT cmd_lineAIf there is no command line present, XQT will prompt for a singleGcommand (which must be less than about 80 characters to satisfy passingFparameters on the SUBMIT command. XQT will then submit itself with forGBATCH processing with the decoded parameters passed to BATCH. It can doGthis because it follows different paths depending on whether or not theCuser is logged on to BATCH or an interactive terminal. Finally, theEprocedure passes back a message to the user who submitted the commandGthat the process is done. No log file will be spooled, but XQT.LOG will3be sitting on the user's directory for examination.