Here are the med control sequences for a tektronix 4010 terminal

("^" stands for typing the <control> key with the following character(s)
simultaneously)

<ESC>	     <ENTER>	     Start an argument sequence ( for  another
			     command).
^N<ESC>      <RECALL>	     Recall the last noncursor-motion argument.
<RUB>	     <BACKS>	     Delete the character before the cursor.
^D	     <DELCHAR>	     Delete the character after the  cursor.
^N^W	     <DELWORD>	     Delete the word under the cursor.
^N2	     <QUOTE>	     Allow the insertion of a control char.
^@ (^space)  <INSRTMD>	     Toggle insert mode.
^H (<-)      <LEFT>	     Move the cursor one space left
^L (->)      <RIGHT>	     Move the cursor one space right.
^K	     <UP>	     Move the cursor one line up.
^J	     <DOWN>	     Move the cursor one line down.
^I (TAB)     <TAB>	     Move the cursor to the next tabstop.
^U	     <BACKTAB>	     Move the cursor to the preceding tabstop.
return (^M)  <RETURN>	     Move to start of next line.
^Nreturn     <INSERT RETURN> Insert a newline, and move to next line
^^ (HOME)    <HOME>	     Move to upper left corner of screen.
^P	     <+PAGE>	     Move one page toward the end of the file.
^A	     <-PAGE>	     Move one page toward the start of the file.
^T	     <+LINES>	     Move a couple of lines toward the eof.
^W	     <-LINES>	     Move a couple of lines toward the start.
^S	     <RSHIFT>	     Shift the screen a couple of spaces right.
^Q	     <LSHIFT>	     Shift the screen a couple of spaces left.
^F	     <+SEARCH>	     Search for a string toward eof.
^B	     <-SEARCH>	     Search toward start of file.
^N^F	     <+REGULAR>      Search for a regular expression toward eof.
^N^B	     <-REGULAR>      Search toward start of file.
^N0	     <ARG>	     Enter a second argument to a command.
^G	     <GOTO>	     Goto specific line.
^N^G	     <MARK>	     Set/goto mark
^_	     <PICK>	     Pick up text (does not delete).
^\	     <PUT>	     Put down the text.
^N^\	     <STORE>	     Put the argument into a buffer
^E	     <OPEN>	     Insert a blank line.
^R	     <CLOSE>	     Delete a line, and save it.
^]	     <RESTORE>	     Put down last thing deleted.
^V	     <USE>	     Edit another file.
^N1	     <SAVE>	     Save this file.
^N6	     <WIND>	     Edit another file in its own window.
^N7	     <CHWIND>	     Change windows.
^Z	     <EXIT>	     Exit from the editor, saving all changed files.
^N9	     <DO>	     Execute a program with input from the file,
			     output back to the file.
^N8	     <SRTAB>	     Set/Reset a tabstop.
^N3	     <REFRESH>	     Refresh the screen.
^N4	     <HELP>	     Enter help mode.
^N5	     <STATUS>	     Examine the status of the files edited.
^N=	     <SET>	     Set a flag in the current file.
^C	     <INTER>	     The interrupt character.
^N<	     <REPEAT>	     Start a list of commands to be repeated
^N>	     <END>	     End a list of commands to be repeated.
^N?	     <IF>	     Conditional
^N^H	     <STOP_REPEAT>   Stop repeats/macros
^N@	     <EXECUTE>	     Execute a buffer.
^N$	     <EVALUATE>      Evaluate a buffer.
^N^T	     <TRANSLATE>     Translate a buffer.
^N^N2	     <ENTER_COM>     Enter a command into the file.


