	    Keypad for TEK4105/VT100 Terminal
	.---------------------------------------,
	|	  |  Help   | +Search |  Close	|    Backtab:	<Backspace>
	| 2nd Fnc |	    | -Search | Restore |    Recall:	^R
	|---------------------------------------|    Enter_Com: ^N <Quote>
	|  +Page  |  -Page  |  Goto   | Del Chr |    Append:	^N <Pick>
	|  Repeat |   End   |  Home   | Del Wrd |    Store:	^N <Put>
	|---------------------------------------|    +Regular:	^F
	|  +Line  |  -Line  |	Pick  | Ch Win	|    -Regular:	^B
	| Set Tab |   Arg   |	Put   | Window	|
	|---------------------------------------|    The remaining keystroke
	| L Shift | Insrtmd |  Save   | 	|    sequences can be found
	| R Shift |  Quote  | Refrsh  |  Enter	|    by pressing <Use>.
	|-----------------------------| 	|
	|	Open	    |	Use   |  Exit	|
	|   Insert Return   |	Mark  | 	|
	`---------------------------------------'

	Searches are set to be case insignificant
