1	JNLBACKUP

	JNLBACKUP is a VAX command procedure which is used to automatically
back up your files to tape and to keep a journal and log of the files
backed up and the tapes used for the backup.  Complete documentation on 
how to use JNLBACKUP is found in JNLBACKUP.MEM. To use JNLBACKUP type 
CMD JNLBACKUP.

JNLBACKUP can be used to backup any or all files in your directory(ies)
which have been created since a certain date.  The backup accuracy is 
automatically verified.  The backed up files are stored in a VMS
BACKUP container file which is automatically given a unique save-set
name.  Multiple backups may be done to a given backup tape.  The
various times JNLBACKUP is used is logged to a file (JNLBACKUP.LOG)
showing the tape name and number, the dates, directories and the 
files selected for backing up.  This log file together with the 
journal file (JNLBACKUP.BJL) containing a list of all backed up
files, can be used to recover one or more files from the specific
backup set required.
