1   TLOAD
    Copies a file from a mounted tape to a VAX disk file.

		format:  TLOAD device file-name[/Qualifiers]

    The tape volume must be mounted using the /FOREIGN qualifier and with
    the proper block-size for the data.  Only files written with data
    blocks larger than the system default may have problems.

    The program provides information about the TLOAD operation:
    Number of records read, Size of largest record read, and 
    Size of smallest record read.
2  /EBCDIC

	Option provides translation from EBCDIC to ASCII format data.
2  /RECORD

		format:  /RECORD=num-records

	This command tells the computer how many records to load
	from the tape to the VAX file.  If not provided the program
	runs till it finds an EOF mark on the tape.
2  /SIZE

		format:  /SIZE=record-size

	This command tells the computer the maximum size of data
	records.  If not provided then the program will assume
	a maximum size of 32767 bytes per record.
2  /SKIP

		format:  /SKIP=n

	This command skips the number of files indicated by the
	value "n".  The program automaticly rewinds the tape when
	the TLOAD command given.  This qualifier allows the user
	to skip past the unwanted files to the file desired.
