


!=====================================================================
!        This file is NOT to be edited.  Edit the input file (see
!        RUNOFF Source File:) to make the changes that you want, and
!        then use the RNOTOHLP tool on it.
!
! RUNOFF Source File:
!        SIG_TAPE_BUILD.REQUIRE
!
! Command Used:
!        $ RNOTOHLP  SIG_TAPE_BUILD.REQUIRE  "SIG_TAPE_BUILD.HLP"  "1" "SIG_TAPE_BUILD"
!
! History:
!        This file was created by AMBY on the CSD630 system
!        at  6-DEC-1991 07:44:31.42 with the RNOTOHLP tool.
!=====================================================================
1 SIG_TAPE_BUILD

This is used to create the backup saveset for the DECUS L&T SIG tape.

         $ @SIG_TAPE_BUILD  tape_saveset backup_quals in_quals out_quals

Where:

      *  tape_saveset    Tape (logical) and saveset name.

      *  backup_quals    optional backup command qualifiers

      *  in_quals        optional input file spec qualifiers

      *  out_quals       optional output file spec qualifiers

2 Tools

The following is a list of some non-standard tools that are used in this
procedure.

      *  DISK_REPORT     from DECUS tape to provide a disk report.

2 Processing

     1.  Set default to Don Amby's login directory before we start.

     2.  Build up a symbol that will contain the file spec of all files
         that are to be submitted.

     3.  Generate a total directory listing to a temp file and use the
         DISK_REPORT tool to write a summary repot.

     4.  Using the symbol with what is to be backed up, generate a
         directory listing of everything.

     5.  Using the list of files to write to tape, issue the BACKUP command
         under the assumption that the use already has the tape allocated
         and mounted. Not a generally safe assumption, but for this
         application it is a reasonable one.

