1       EQACNT
        Invokes the account change program to change your
        current account setting during a session.  The new
        account will also be used for future login sessions
        until your current/default account is changed again
        using the EQACNT command.

        Format:

                EQACNT account-or-cc#
2       Parameters

        account-or-cc#

        The account name or cost centre number to be set.

        If an account name is specified, it may be a maximum
        of 8 characters, and must match the actual account
        name.

        If a cost centre number is specified, 3 or 4 digits
        must be specified.  The account will be changed to
        the corresponding account name for that cost centre.
        If more than one account name uses the same cost
        centre number, the account name should be specified.
2       Examples

        1.  $ EQACNT GRPCLM
            %EQACNT-S-NEWACC, account set to GRPCLM, CC# 9640
            $

            In this example, the user has changed the current
            account to "GRPCLM".


        2.  $ EQACNT 204
            %EQACNT-S-NEWACC, account set to ACTLDEV, CC# 0204
            $

            In this example, the user has changed the current
            account to "ACTLDEV" using the cost centre number.
