
1 EXIT
Select EXIT to leave the GPLOT menu.  If no device has been selected
you will have an opportunity to redisplay the menu and select a device.

1 HPGL-File
The file GPLOT.HPGL will be created in your current directory.  You must
have write access to the current directory for the file to be created.
HPGL files can be included in some word-processing documents or converted
to other formats.

1 HP7550
Creates file GPLOT.HP7550 in the SYS$SCRATCH: directory, then prints the file
on the HP print queue.  The Hewlett-Packard HP7550A plotter is located in
Building 399.  This plotter has a sheet-feeder and accepts either 8.5 X 11
paper or 11 X 17 paper.

1 LA75
Produces file GPLOT.LA75 in the current directory.  This can be printed
on a DEC LA75 printer.

1 VAXstation
VAXstation II/GPX graphics using VWS.  All GPLOT Input/Output functions
are supported.

1 VT240
DEC Monochrome graphics terminal.  GPLOT REGIS output is sent to SYS$OUTPUT.

1 VT241
DEC Color graphics terminal.  GPLOT REGIS output is sent to SYS$OUTPUT.

1 VT330
DEC Monochrome graphics terminal.  GPLOT REGIS output is sent to SYS$OUTPUT.

1 VT340
DEC Color graphics terminal.  GPLOT REGIS output is sent to SYS$OUTPUT.

1 TK4014
Produces a plot on a Tektronix 4014 terminal emulator such as the HDS or 
Graphon terminals at IPNS.  The terminal is automatically switched to and 
from Tektronix mode at the beginning and end of the plot.  A 
programmer can switch back and forth through use of the GPUSH and GPOP
routines which push the graphics display behind or pop it in front of 
the text display.  With the HDS terminal it is possible to erase areas
of the screen.

1 TK4107
Tektronix Color graphics terminal.  Output is sent to SYS$OUTPUT.

1 TK4014-File
Produces file GPLOT.TK4014 in your current directory.  This can later
be printed on an LN03-Plus printer or other printer having Tektronix 4014
graphics capability.  It can also be viewed on a Tektronix 4014 terminal
by first setting your terminal to PASTHRU and then typing the file.  Set
your terminal to /NOPASTHRU after displaying the file.

1 BEV-AST
The AST Printer in IPNS accelerator Operations Office, Building 360.  A 
Postscript file is produced in the SYS$SCRATCH directory and then printed 
on the AST queue.

1 BEV-LN03P
The AST Printer in LN03-Plus emulation mode.  The printer is located in 
IPNS accelerator Operations Office, Building 360.  A TK4014 file is 
produced in the SYS$SCRATCH directory and then printed on the AST queue.

1 Postscript-File
A Postscript file named GPLOT.PS will be created in the current directory.
Postscript devices have the capability of producing any of the built-in 
fonts in any size and orientation, so very high quality text can be 
produced.  They also have the feature of being able to draw in background
color, allowing areas of the plot to be erased.
       
1 DP_PS
Dataproducts 1260 Postscript printer in Building 360, Room L120 
A Postscript file is created in the SYS$SCRATCH directory and then
it is printed to the DP_PS queue and deleted.  You can also use this
print queue to print any Postscript file and can print multiple pages
per sheet if desired. For multiple pages per sheet, use the number_up 
parameter:
	/PARAMETER=(NUMBER_UP=2)
	/PARAMETER=(NUMBER_UP=4)
For Landscape orientation, use the following:
	/PARAMETER=(PAGE_ORIENT=LANDSCAPE)
These two parameters may be combined.  To use these same features on
text files, print to queue DP_ANSI.

1 B399-LN03P
Produces a TK4014 output file, then prints it on the B399-LN03 print
queue.  The LN03-Plus Printer is located in Bldg. 399.

1 LW-Postscript
Produces a Postscript file in the SYS$SCRATCH directory, then prints it
on the LW print queue.  The LW queue goes to the Apple LaserWriter Printer
in the IPNS Control Room -- Building 360.
 
1 NPB-LN03P
Produces a TK4014 output file and then prints it on the NPB print
queue.  The NPB LN03-Plus Printer is located in the corner of the terminal
area of the IPNS Control Room -- Building 360.

1 LJ250
 Printer:  DEC LJ250 color ink-jet printer (90 DPI)
Location:  Building 360 Control Room, Terminal area.
Features:  256 Colors, 90 DPI resolution on paper or transparency.

1 LJ25X
 Printer:  DEC LJ250 color ink-jet printer (180 DPI)
Location:  Building 360 Control Room, Terminal area.
Features:  16 Colors, 90 DPI resolution on paper or transparency.

1 375T-LN03P
Produces a TK4014 file in directory SYS$SCRATCH, then prints it
on the 375T print queue.  The printer is located in the Green Trailer 
inside Building 375. 

1 B223_LASER
Produces a Tektronix 4014 file in directory SYS$SCRATCH, then prints it on
the B223_LASER print queue.  The B223_laser queue goes to the Talaris Laser 
Printer located in Room D214 of Building 223. 

1 DDIF-File
Produces a file in DEC DDIF (Digital Document Innterchange Format).  This 
file can be viewed using the DECwindows DDIF viewer and can be included
in some documents.

1 DECWINDOWS
Produces a window on a DECwindows display device and does a plot.  This 
device (type 211) supports both input and output.

1 DECWIDGET
Produces a plot in a previously created DECwindows Widget.

1 CGM-Metafile
Produces a Computer Graphics Metafile (CGM).  Currently these files are 
not supported for input to DEC GKS.  They also are not much use elsewhere
because their 512 Byte record length prevents them from being compatible
with DISSPLA, for instance.

1 GKS-Metafile
Produces a GKS metafile which can be plotted using the POSTGKS command.
GKS metafiles can be edited using the EVE editor.  They are a record of 
GKS instructions used to create a plot.  See the DEC GKS documentation for
an explanation of the various metafile codes.

1 WISS
Workstation Independent Segment Storage (WISS) may be used to save the plot
frame in memory so it can be transferred to a hardcopy device when the
plot frame is completed.  If WISS is open, subroutine ENDPL will ask if
you want to make a hardcopy plot of that frame.

