!
1 SPACE
!
 Displays disk space of mounted disks.  Syntax:

	$ SPACE disk(s),... [qualifier(s)]

 The qualifiers used determine what information is displayed.  By default
 the specified disk(s)'s volume name and number of free blocks is displayed.
!
2 Parameter
!
 One or more disk logical or physical names.  Wild cards are allowed.  If
 a wild card is used, it is checked against both physical names and volume
 names.  If no parameter is used, the current default disk is listed.  Disks
 are listed in alphabetical order of volume name.  If the system disk is
 listed, the fact that it is the system disk is noted.

 Examples:
		$ SPACE UDISK*
		$ SPACE $*$*DUA% /VOL/DEV/FREE/USED/TOTAL/PCT
!
2 Qualifiers
/VOLUME

 Display volume name of disk(s).  This is the default.  If /DEVICE is
 specified, only the physical device name is displayed.  If both /VOLUME
 and /DEVICE are specified, both names are displayed.

/DEVICE

 Display physical device name of disk(s).  If /VOLUME is also specified,
 then both the volume name and physical device name are displayed.

/FREE

 Display free blocks.  This is the default.

 Any or all of the qualifiers /FREE, /USED, /TOTAL, and /PCT can be used
 individually or together.

/USED

 Display blocks in use.

 Any or all of the qualifiers /FREE, /USED, /TOTAL, and /PCT can be used
 individually or together.

/TOTAL

 Display total number of blocks (free+used) on the disk.

 Any or all of the qualifiers /FREE, /USED, /TOTAL, and /PCT can be used
 individually or together.

/PCT

 Display percent full.

 Any or all of the qualifiers /FREE, /USED, /TOTAL, and /PCT can be used
 individually or together.

