1 GETCMD



   GETCMD displays the DCL command recall buffer for  any  process  on

   the  system.   Unlike DCL's RECALL command, GETCMD will display all

   of the commands stored in the buffer, not the 20 or  255  displayed

   by RECALL.





     $ GETCMD pid

2 Parameter



   The PID of the target process must  be  specified  on  the  command

   line.  Only processes on the local system may be specified.

2 Qualifiers



/OUTPUT



   /OUTPUT=filename



   Redirects the GETCMD output to the specified file instead of to the

   screen.

/PAGE



   /PAGE



   Prompts the user to press RETURN to continue after each full screen

   of GETCMD output.

2 Author



   GETCMD was written by Hunter Goatley <goathunter@PROCESS.COM>



   Copyright © 1992--1996, Hunter Goatley.  All rights reserved.

