This is just a small test document.

This is just a small document to see if Antiword has been compiled correctly. The images will only show in the PostScript mode.

Figure 1 This JPEG image is the Antiword icon.

Figure 2 This PNG image is the cover of the O`Reilly book about PNG. NOTE: this image only shown correctly when Antiword is run with the ~-i 0¯ option.