1 MBMONCP

  MBMONCP is the user interface for MONCP.

  MBMON is a utility for monitoring mailboxes. MBU displays and/or
  records for later display any message written to the monitored mailbox.

2 MONITOR
  The monitor command monitors a mailbox.
  Format:
         MONITOR mailbox_name

3 Parameter
  mailbox_name is the logical name or device name of a mailbox.
3 Command_qualifiers
/OUTPUT
  /OUTPUT=filename
  Specifies the file to which the messages are to be output.
  If this qualifier is not used then the messages are output to 
  SYS$OUTPUT.
/RECORD
  /RECORD=filename
  Specifies the file to which the messages are to be written for display
  later.
/DATA_SIZE
  /DATA_SIZE=size
  Specifies the size of each element in the message.
  If no size is given then the current default is used.
  If format is TEXT then DATA_SIZE is ignored.

  Size is either BYTE, WORD, LONG, or QUADWORD.
/FORMAT
  /FORMAT=format
  Defines the format that the message contents will be output.
  If no format name is given then the current default is used.

  Format is either HEX, DECIMAL, or TEXT.

  For TEXT format non-printable characters are replaced by '.'
/LENGTH
  /LENGTH=n
  Specifies a limit on the number of bytes of each message that are output.

2 DISPLAY
  The display command displays messages previously recorded to a file
  by the MONITOR command
  Format:
         DISPLAY filename

3 Parameter
  filename is the name of the containing the previously recorded messages.
3 Command_qualifiers
/DATA_SIZE
  /DATA_SIZE=size
  Specifies the size of each element in the message.
  If no size is given then the current default is used.
  If format is TEXT then DATA_SIZE is ignored.

  Size is either BYTE, WORD, LONG, or QUADWORD.
/FORMAT
  /FORMAT=format
  Defines the format that the message contents will be output.
  If no format name is given then the current default is used.

  Format is either HEX, DECIMAL, or TEXT.

  For TEXT format non-printable characters are replaced by '.'
/LENGTH
  /LENGTH=n
  Specifies a limit on the number of bytes of each message that are output.

2 EXIT
  Exits from MBMON utility.
2 HELP
  The help command displays help for a particular MBMON command 
  and starts a interactive help session.

  Format:
         HELP [command]
2 VERSION
  Displays the version of the Mailbox Monitor utility.

2 Startup
  To startup MBMON for use 

	@MBMON_STARTUP

  (requires CMKRNL, SYSMAN, SYSPRV privileges)

2 Shutdown
  To shutdown MBMON use

	@MBMON_SHUTDOWN

  (requires CMKRNL, SYSMAN, SYSPRV privileges)

2 Author 
  This program was written by Ian Miller.

  Bug reports to

	miller@encompasserve.org

  COPYRIGHT NOTICE

  This software is COPYRIGHT © 2005, Ian Miller. ALL RIGHTS RESERVED.

